Table of Gamma-ray objects which will be observed by spacecraft INTEGRAL.

Coordinates of Gamma-ray objects which coordinates are less than ±13 deg from Galactic equator.

In the columns there are the names of objects with positions less than ±13 deg from the Galactic equator, then spectral index (SI) and coordinates (Third EGRET catalog (3EG) (Hartman+, 1999) and Supplement to Second EGRET Catalog (Thompson+ 1996)).

Objects were found by VizieR Service^1.

Elaborated by Radomir Smida^2.

1http://vizier.u-strasbg.fr/viz-bin/VizieR 2radomir smida@yahoo.com

Name of object SI RA J2000 DE J2000 G.lon G.lat 3EG J1746-2851 1.70 266.51 -28.86 0.11 -00.04 3EG J1741-2312 2.49 265.42 -23.21 4.42 +03.75 3EG J1834-2803 2.62 278.59 -28.06 5.92 -08.98 2EG SJ1833-2754 278.45 -27.91 6.00 -08.80 3EG J1800-2338 2.10 270.12 -23.65 6.24 -00.18 3EG J1741-2050 2.25 265.41 -20.84 6.44 +05.00 3EG J1809-2328 2.06 272.49 -23.47 7.46 -01.99 3EG J1850-2652 2.29 282.67 -26.88 8.58 -11.74 3EG J1735-1500 3.24 263.97 -15.00 10.73 +09.22 3EG J1832-2110 2.59 278.10 -21.18 11.92 -05.50 3EG J1733-1313 2.23 263.46 -13.23 12.00 +10.57 3EG J1858-2137 3.45 284.61 -21.62 14.21 -11.14 3EG J1746-1001 2.55 266.50 -10.03 16.34 +09.64 3EG J1824-1514 2.19 276.20 -15.24 16.37 -01.16 3EG J1812-1316 2.29 273.14 -13.27 16.70 +02.38 3EG J1823-1314 2.69 275.77 -13.24 17.94 +00.14 3EG J1826-1302 2.00 276.55 -13.04 18.48 -00.44 3EG J1810-1032 2.29 272.52 -10.54 18.81 +04.22 3EG J1757-0711 2.51 269.48 -7.20 20.30 +08.46 3EG J1904-1124 2.60 286.21 -11.41 24.22 -08.12 2EG SJ1905-1120 286.38 -11.34 24.36 -08.24 3EG J1800-0146 2.79 270.22 -1.78 25.49 +10.40 3EG J1837-0606 1.82 279.26 -6.10 25.86 +00.41 3EG J1837-0423 2.71 279.41 -4.40 27.44 +01.05 3EG J1828+0142 2.76 277.25 1.72 31.90 +05.78 3EG J1856+0114 1.93 284.10 1.24 34.60 -00.54 3EG J1940-0121 3.15 295.23 -1.36 37.41 -11.62 2EG SJ1903+0529 285.77 5.49 39.14 -00.08 3EG J1903+0550 2.38 285.91 5.84 39.52 -00.04 3EG J1928+1733 2.23 292.10 17.56 52.71 +00.08 3EG J1958+2909 1.85 299.69 29.16 66.23 -00.16 3EG J2027+3429 2.28 306.95 34.50 74.08 -02.36 3EG J2016+3657 2.09 304.05 36.94 74.74 +00.97 3EG J2021+3716 1.86 305.30 37.27 75.58 +00.33 3EG J2020+4017 2.08 305.25 40.30 78.05 +02.08 3EG J2033+4118 1.96 308.41 41.32 80.27 +00.73 3EG J2022+4317 2.31 305.52 43.29 80.63 +03.62 3EG J2035+4441 2.08 308.85 44.69 83.17 +02.49 3EG J2202+4217 2.60 330.60 42.29 92.55 -10.40 3EG J2100+6012 2.21 315.18 60.21 97.76 +09.17 3EG J2227+6122 2.24 336.81 61.37 106.53 +03.18 3EG J2206+6602 2.29 331.60 66.05 107.23 +08.35 3EG J0229+6151 2.29 37.32 61.86 134.20 +01.15 3EG J0241+6103 2.21 40.41 61.07 135.86 +01.00 3EG J0323+5122 2.38 50.90 51.37 145.64 -04.67 3EG J0435+6137 2.46 68.92 61.62 146.50 +09.50 2EG SJ0500+5902 75.15 59.04 150.50 +10.26 3EG J0510+5545 2.19 77.63 55.77 153.98 +09.42 3EG J0416+3650 2.59 64.04 36.84 162.21 -09.97 3EG J0533+4751 2.55 83.32 47.85 162.62 +07.95

Name of object SI RA J2000 DE J2000 G.lon G.lat 3EG J0459+3352 2.54 74.78 33.87 170.31 -05.38 3EG J0433+2908 1.90 68.40 29.14 170.48 -12.58 3EG J0546+3948 2.85 86.55 39.81 170.75 +05.74 3EG J0613+4201 1.92 93.49 42.02 171.33 +11.40 3EG J0500+2529 2.52 75.07 25.49 177.18 -10.27 3EG J0520+2556 2.83 80.14 25.75 179.65 -06.40 3EG J0516+2320 2.67 79.11 23.35 181.12 -08.53 3EG J0542+2610 2.67 85.69 26.17 182.03 -01.99 3EG J0521+2147 2.48 80.38 21.80 183.08 -08.43 3EG J0534+2200 2.19 83.57 22.01 184.53 -05.84 3EG J0617+2238 2.01 94.30 22.63 189.00 +03.05 3EG J0530+1323 2.46 82.74 13.38 191.50 -11.09 3EG J0628+1847 2.30 97.18 18.79 193.66 +03.64 3EG J0633+1751 98.49 17.86 195.06 +04.32 2EG SJ0555+0408 88.95 4.14 202.77 -10.40 3EG J0556+0409 2.45 89.06 4.15 202.81 -10.30 3EG J0631+0642 2.06 97.92 6.72 204.70 -01.30 3EG J0634+0521 2.03 98.51 5.36 206.18 -01.41 3EG J0616-0720 2.43 94.16 -7.35 215.59 -11.06 3EG J0622-1139 2.67 95.58 -11.66 220.16 -11.69 3EG J0747-3412 2.22 116.88 -34.22 249.35 -04.48 3EG J0903-3531 2.66 135.79 -35.53 259.40 +07.40 3EG J0827-4247 2.10 126.98 -42.79 260.83 -02.46 3EG J0824-4610 126.17 -46.18 263.27 -04.88 3EG J0841-4356 2.15 130.49 -43.95 263.29 -01.11 3EG J0834-4511 128.73 -45.20 263.53 -02.86 2EG SJ0852-4343 133.05 -43.73 264.28 +00.47 3EG J0848-4429 2.05 132.25 -44.50 264.51 -00.46 3EG J0859-4257 2.32 134.92 -42.95 264.56 +02.01 3EG J0828-4954 2.59 127.24 -49.91 266.75 -06.45 3EG J0808-5344 2.46 122.11 -53.75 268.25 -11.20 3EG J0821-5814 3.22 125.32 -58.24 273.10 -12.05 3EG J1014-5705 2.23 153.54 -57.10 282.80 -00.51 3EG J1013-5915 2.32 153.34 -59.25 283.93 -02.34 3EG J1027-5817 1.94 156.90 -58.27 284.94 -00.51 3EG J1058-5234 1.94 164.68 -52.57 286.14 +06.59 3EG J1102-6103 2.47 165.60 -61.05 290.12 -00.92 3EG J1308-6112 3.14 197.18 -61.22 305.01 +01.58 3EG J1316-5244 2.54 199.24 -52.75 306.85 +09.93 3EG J1410-6147 2.12 212.73 -61.73 312.20 -00.30 2EG SJ1418-6049 214.54 -60.82 313.31 +00.29 3EG J1420-6038 2.02 215.11 -60.64 313.63 +00.37 3EG J1659-6251 2.54 254.97 -62.86 327.32 -12.47 2EG SJ1703-6302 255.79 -63.05 327.39 -12.88 3EG J1638-5155 2.56 249.64 -51.92 334.05 -03.34 3EG J1639-4702 2.50 249.78 -47.04 337.75 -00.15

Name of object SI RA J2000 DE J2000 G.lon G.lat 2EG SJ1653-4604 253.34 -46.07 340.08 -01.38 3EG J1704-4732 1.86 256.12 -47.54 340.10 -03.79 3EG J1655-4554 2.19 253.95 -45.90 340.48 -01.61 3EG J1655-4554 2.19 253.95 -45.90 340.48 -01.61 3EG J1631-4033 2.25 247.85 -40.56 341.60 +05.24 3EG J1631-4033 2.25 247.85 -40.56 341.60 +05.24 3EG J1710-4439 1.86 257.55 -44.67 343.00 -02.87 3EG J1710-4439 1.86 257.55 -44.67 343.00 -02.87 3EG J1714-3857 2.30 258.52 -38.96 348.04 -00.09 3EG J1714-3857 2.30 258.52 -38.96 348.04 -00.09 3EG J1633-3216 2.58 248.43 -32.28 348.10 +10.48 3EG J1744-3934 2.42 266.20 -39.57 350.81 -05.38 2EG SJ1800-4005 270.01 -40.10 351.82 -08.18 3EG J1800-3955 3.10 270.22 -39.93 352.05 -08.24 3EG J1638-2749 2.47 249.67 -27.83 352.25 +12.59 3EG J1718-3313 2.59 259.56 -33.22 353.21 +02.56 3EG J1718-3313 2.59 259.56 -33.22 353.21 +02.56 2EG SJ1642-2659 250.62 -26.99 353.46 +12.48 3EG J1734-3232 263.56 -32.55 355.64 +00.15 3EG J1717-2737 2.23 259.30 -27.63 357.67 +05.95 2EG SJ1736-2904 264.02 -29.07 358.78 +01.70 3EG J1736-2908 2.18 264.16 -29.14 358.79 +01.56 3EG J1744-3011 2.17 266.23 -30.19 358.85 -00.52